<script setup lang="ts">
import { CurveType } from '@unovis/ts'
import { AreaChart } from '@/lib/registry/new-york/ui/chart-area'

const data = [
  { name: 'Jan', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Feb', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Mar', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Apr', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'May', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Jun', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Jul', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Aug', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Sep', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Oct', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Nov', total: Math.floor(Math.random() * 2000) + 1000 },
  { name: 'Dec', total: Math.floor(Math.random() * 2000) + 1000 },
]
</script>

<template>
  <AreaChart
    class="h-[100px] w-[400px]"
    index="name"
    :data="data"
    :categories="['total']"
    :show-grid-line="false"
    :show-legend="false"
    :show-x-axis="false"
    :show-y-axis="false"
    :curve-type="CurveType.Linear"
  />
</template>
